# HeidiSQL Dump 
#
# --------------------------------------------------------
# Host:                 192.168.0.2
# Database:             parser
# Server version:       5.0.60-log
# Server OS:            pc-linux-gnu
# Target-Compatibility: Same as source server (MySQL 5.0.60-log)
# max_allowed_packet:   16777216
# HeidiSQL version:     3.1 RC1 Revision: 1064
# --------------------------------------------------------

/*!40100 SET CHARACTER SET latin1*/;
/*!40014 SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0*/;


#
# Dumping data for table 'raw_factions'
#

# (No data found.)

/*!40014 SET FOREIGN_KEY_CHECKS=@OLD_FOREIGN_KEY_CHECKS*/;
